;************************************************************************
;
; This is the .DEF file for the Microsoft Visual C++ Run-Time Library DLL
; The release version is MSVCP60.DLL and the debug version MSVCP60D.DLL.
;
;************************************************************************
LIBRARY MSVCP60D
EXPORTS
